\section{Introduction}
% The very first letter is a 2 line initial drop letter followed
% by the rest of the first word in caps.
% 
% form to use if the first word consists of a single letter:
% \IEEEPARstart{A}{demo} file is ....
% 
% form to use if you need the single drop letter followed by
% normal text (unknown if ever used by the IEEE):
% \IEEEPARstart{A}{}demo file is ....
% 
% Some journals put the first two words in caps:
% \IEEEPARstart{T}{his demo} file is ....
% 
% Here we have the typical use of a "T" for an initial drop letter
% and "HIS" in caps to complete the first word.
\IEEEPARstart{T}{his} demo file is intended to serve as a ``starter file''
for IEEE journal papers produced under \LaTeX\ using
IEEEtran.cls version 1.8b and later.
% You must have at least 2 lines in the paragraph with the drop letter
% (should never be an issue)
I wish you the best of success.

\hfill mds
 
\hfill August 26, 2015